02468101214161834.0

21:57:30.0

26.0

42:30.0

43:00.0

30.0

-20:44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00668689000 / DATE-OBS 2015-12-29T06:55:46.0

UVOT Finding Chart