01234567898:48:50.0

46.0

42.0

21:00.0

30.0

-16:22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00670800000 / DATE-OBS 2016-01-17T14:04:19.1

UVOT Finding Chart