0.51.52.53.5424.0

7:16:20.0

16.0

12.0

33:00.0

30.0

34:00.0

-23:35:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00671231000 / DATE-OBS 2016-01-21T14:05:13.6

UVOT Finding Chart