01234567814.0

10:01:10.0

06.0

45:30.0

46:00.0

30.0

-33:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00671447000 / DATE-OBS 2016-01-23T09:03:31.6

UVOT Finding Chart