0123456754.0

15:03:50.0

46.0

07:00.0

30.0

0:06:00.0

05:00.0

04:00.0

RA (J2000)

Dec (J2000)

OBSID 00671828000 / DATE-OBS 2016-01-27T08:48:18.0

UVOT Finding Chart