2500

3000

3500

4000

4500

30.0

10:24:00.0

56:00.0

54:00.0

52:00.0

19:50:00.0

48:00.0

46:00.0

44:00.0

42:00.0

40:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00672897000 / DATE-OBS 2016-02-07T23:53:09.0

UVOT Finding Chart