0123456718.0

14.0

10:24:10.0

48:00.0

30.0

19:47:00.0

46:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00672897000 / DATE-OBS 2016-02-07T23:55:47.0

UVOT Finding Chart