051015202510.0

10:57:00.0

56:50.0

30.0

41:00.0

53:40:00.0

39:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00675998000 / DATE-OBS 2016-02-25T14:35:11.4

UVOT Finding Chart