0102030405060708017:09:00.0

56.0

52.0

08:48.0

22:30.0

23:00.0

30.0

-36:24:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00677582000 / DATE-OBS 2016-03-03T22:47:43.0

UVOT Finding Chart