010203040506070809006.0

17:09:00.0

08:54.0

25:30.0

26:00.0

30.0

-36:27:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 00677981000 / DATE-OBS 2016-03-06T09:53:11.8

UVOT Finding Chart