0.51.52.53.5438.0

34.0

7:55:30.0

26.0

32:00.0

30.0

-29:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00679432000 / DATE-OBS 2016-03-16T22:56:06.3

UVOT Finding Chart