010203040506044.0

6:37:40.0

36.0

32.0

30.0

44:00.0

5:43:00.0

42:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 00680017000 / DATE-OBS 2016-03-21T16:10:20.2

UVOT Finding Chart