2000

2500

3000

3500

4000

1:04:30.0

1:03:00.0

1:01:30.0

32:00.0

34:00.0

36:00.0

38:00.0

-72:40:00.0

42:00.0

44:00.0

46:00.0

48:00.0

50:00.0

RA (J2000)

Dec (J2000)

OBSID 00680436000 / DATE-OBS 2016-03-25T07:05:07.4

UVOT Finding Chart