051015202530.0

15.0

8:10:00.0

71:10:00.0

30.0

09:00.0

08:00.0

07:00.0

RA (J2000)

Dec (J2000)

OBSID 00682059000 / DATE-OBS 2016-04-08T06:27:38.2

UVOT Finding Chart