05101520253035408:01:00.0

56.0

00:52.0

30.0

41:00.0

7:40:00.0

39:00.0

38:30.0

RA (J2000)

Dec (J2000)

OBSID 00683076000 / DATE-OBS 2016-04-17T04:26:12.8

UVOT Finding Chart