05101520253030.0

18:41:20.0

10.0

-54:20:00.0

30.0

21:00.0

22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00684098000 / DATE-OBS 2016-04-25T23:29:55.7

UVOT Finding Chart