0123456711:20:20.0

10.0

30.0

01:00.0

56:00:00.0

55:59:00.0

58:30.0

RA (J2000)

Dec (J2000)

OBSID 00685124000 / DATE-OBS 2016-05-04T19:35:10.6

UVOT Finding Chart