0.20.40.60.81.21.41.61.82.238.0

34.0

19:37:30.0

21:40:00.0

30.0

39:00.0

38:00.0

37:30.0

RA (J2000)

Dec (J2000)

OBSID 00686761000 / DATE-OBS 2016-05-18T09:14:16.0

UVOT Finding Chart