024681012141618202204.0

19:35:00.0

34:56.0

54:00.0

30.0

21:53:00.0

52:00.0

51:30.0

RA (J2000)

Dec (J2000)

OBSID 00686842000 / DATE-OBS 2016-05-19T05:43:06.9

UVOT Finding Chart