3000

3200

3400

3600

3800

4000

4200

4400

4600

4800

41:00.0

15:40:00.0

39:00.0

38:00.0

36:00.0

34:00.0

32:00.0

64:30:00.0

28:00.0

26:00.0

24:00.0

22:00.0

20:00.0

RA (J2000)

Dec (J2000)

OBSID 00688452000 / DATE-OBS 2016-06-01T14:48:08.3

UVOT Finding Chart