012345678920.0

10.0

15:40:00.0

31:00.0

30.0

64:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 00688452000 / DATE-OBS 2016-06-01T14:48:08.3

UVOT Finding Chart