01020304050607044.0

17:45:40.0

36.0

32.0

-28:59:00.0

30.0

-29:00:00.0

01:00.0

02:00.0

RA (J2000)

Dec (J2000)

OBSID 00689353000 / DATE-OBS 2016-06-06T12:45:09.8

UVOT Finding Chart