012345678943.0

0:54:40.0

37.0

55:30.0

56:00.0

30.0

-4:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00689597000 / DATE-OBS 2016-06-07T11:28:51.7

UVOT Finding Chart