02040608010012010:58:00.0

50.0

40.0

57:30.0

22:00.0

30.0

-70:23:00.0

24:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00690598000 / DATE-OBS 2016-06-11T22:25:37.8

UVOT Finding Chart