0510152025303506.0

16:20:00.0

19:54.0

28:30.0

29:00.0

30.0

-15:30:00.0

31:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 00690638000 / DATE-OBS 2016-06-12T02:39:08.7

UVOT Finding Chart