02468101214161858.0

54.0

19:34:50.0

46.0

30.0

55:00.0

21:54:00.0

53:00.0

52:30.0

RA (J2000)

Dec (J2000)

OBSID 00701182000 / DATE-OBS 2016-06-23T19:39:27.0

UVOT Finding Chart