02468101214161854.0

22:00:50.0

46.0

30.0

39:00.0

29:38:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00701288000 / DATE-OBS 2016-06-24T11:28:34.5

UVOT Finding Chart