01234567824.0

19:58:20.0

16.0

12.0

15:00.0

30.0

35:14:00.0

13:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00701454000 / DATE-OBS 2016-06-25T16:17:52.9

UVOT Finding Chart