012345619:35:00.0

56.0

52.0

34:48.0

55:00.0

30.0

54:00.0

21:53:00.0

52:00.0

51:30.0

RA (J2000)

Dec (J2000)

OBSID 00701590000 / DATE-OBS 2016-06-26T14:00:11.9

UVOT Finding Chart