02468101214161852.0

48.0

44.0

12:25:40.0

30.0

46:00.0

12:45:00.0

44:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00701668000 / DATE-OBS 2016-06-26T23:39:59.0

UVOT Finding Chart