0102030405019:58:30.0

19:58:24.0

19:58:18.0

30.0

13:00.0

35:12:00.0

11:00.0

10:30.0

RA (J2000)

Dec (J2000)

OBSID 00702630000 / DATE-OBS 2016-07-02T23:40:12.5

UVOT Finding Chart