0510152025303515:38:00.0

50.0

37:40.0

30.0

51:00.0

63:50:00.0

49:00.0

48:30.0

RA (J2000)

Dec (J2000)

OBSID 00704310000 / DATE-OBS 2016-07-14T02:47:33.8

UVOT Finding Chart