024681012141606.0

14:11:00.0

30.0

31:00.0

13:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 00706871000 / DATE-OBS 2016-08-01T09:43:25.7

UVOT Finding Chart