0510152025303540455054.0

6:32:50.0

46.0

45:30.0

46:00.0

30.0

-22:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00707517000 / DATE-OBS 2016-08-06T05:33:16.5

UVOT Finding Chart