510152025303512:12:30.0

20.0

38:30.0

39:00.0

30.0

-67:40:00.0

41:00.0

RA (J2000)

Dec (J2000)

OBSID 00709907000 / DATE-OBS 2016-08-26T06:27:25.2

UVOT Finding Chart