4000

4500

5000

5500

6000

10:50:00.0

30.0

49:00.0

48:00.0

40:00.0

42:00.0

44:00.0

46:00.0

-50:50:00.0

52:00.0

54:00.0

56:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00711084000 / DATE-OBS 2016-09-05T11:23:55.1

UVOT Finding Chart