01020304050607006.0

10:49:00.0

54.0

48:48.0

46:30.0

47:00.0

30.0

-50:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00711084000 / DATE-OBS 2016-09-05T11:33:35.3

UVOT Finding Chart