051015202530354038.0

34.0

9:01:30.0

26.0

22.0

30:30.0

31:00.0

30.0

-40:32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 00711158000 / DATE-OBS 2016-09-06T03:05:39.5

UVOT Finding Chart