051015202510.0

20:06:00.0

05:50.0

30.0

34:00.0

57:33:00.0

32:00.0

31:30.0

RA (J2000)

Dec (J2000)

OBSID 00711914000 / DATE-OBS 2016-09-12T16:10:17.3

UVOT Finding Chart