4000

4500

5000

5500

6000

4:48:00.0

47:00.0

08:00.0

10:00.0

12:00.0

14:00.0

16:00.0

18:00.0

-57:20:00.0

22:00.0

24:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 00714404000 / DATE-OBS 2016-10-01T01:06:41.6

UVOT Finding Chart