0.51.52.53.54.550.0

4:47:40.0

30.0

15:30.0

16:00.0

-57:17:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 00714404000 / DATE-OBS 2016-10-01T01:10:14.1

UVOT Finding Chart