0246810121416182044.0

7:28:40.0

36.0

32.0

28.0

52:00.0

30.0

-39:53:00.0

54:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00715246000 / DATE-OBS 2016-10-04T23:22:48.2

UVOT Finding Chart