0246810121416182044.0

6:53:40.0

36.0

32.0

23:20:00.0

30.0

19:00.0

18:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 00716127000 / DATE-OBS 2016-10-07T21:30:51.4

UVOT Finding Chart