051015202530354045505516:23:00.0

56.0

52.0

22:48.0

8:20:00.0

30.0

19:00.0

18:00.0

17:30.0

RA (J2000)

Dec (J2000)

OBSID 00716876000 / DATE-OBS 2016-10-11T05:57:09.0

UVOT Finding Chart