024681012141616:23:00.0

56.0

22:52.0

8:20:00.0

30.0

19:00.0

18:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 00716876000 / DATE-OBS 2016-10-11T06:00:41.4

UVOT Finding Chart