2000

2500

3000

3500

4000

4500

12:00.0

30.0

13:11:00.0

10:30.0

06:00.0

04:00.0

02:00.0

44:00:00.0

58:00.0

56:00.0

54:00.0

52:00.0

43:50:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00718919000 / DATE-OBS 2016-10-23T17:13:35.5

UVOT Finding Chart