0123456789101124.0

13:11:20.0

16.0

12.0

30.0

57:00.0

43:56:00.0

55:00.0

54:30.0

RA (J2000)

Dec (J2000)

OBSID 00718919000 / DATE-OBS 2016-10-23T17:16:13.3

UVOT Finding Chart