024681012141618202242.0

38.0

34.0

11:59:30.0

04:30.0

05:00.0

30.0

-5:06:00.0

07:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 00722063000 / DATE-OBS 2016-11-13T17:35:17.3

UVOT Finding Chart