0510152025303530.0

20.0

10.0

19:55:00.0

40:30.0

41:00.0

30.0

-67:42:00.0

43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00722642000 / DATE-OBS 2016-11-17T10:04:36.1

UVOT Finding Chart