02040608010012020.0

15.0

10.0

05.0

9:20:00.0

07:00.0

30.0

08:00.0

09:00.0

-51:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00722681000 / DATE-OBS 2016-11-17T15:28:51.4

UVOT Finding Chart